#       main topics:
UP      arb.hlp
UP      glossary.hlp

#       sub topics:
SUB     set_protection.hlp

# format described in ../help.readme


TITLE		Set protection level

OCCURRENCE	ARB_NT/Protection

DESCRIPTION	An individual protection level (0 - 6) can be assigned to
		all types of database entries (sequences and additional
		information stored in a particular 'field').
		To modify any entries, a protection level has to be selected
		from the 'Protection' menu of the main window equal to or higher
		than that assigned to the data.


NOTES		None

EXAMPLES	None	

WARNINGS	It is recommended to reset the protection level after
		performing operations to prevent unintentional modification
		or loss of data.

BUGS		No bugs known

