#       main topics:
UP      arb.hlp
UP      glossary.hlp

#       sub topics:
#SUB     subtopic.hlp

# format described in ../help.readme


TITLE		Jump to selected gene

OCCURRENCE	ARB_NT/Genome/Gene Map/JUMP

DESCRIPTION     Scrolls the display to the currently selected gene.

		Press multiple times to center the gene or toggle between multiple
		display positions of one gene (happens e.g. in book-style mode).

NOTES		See also LINK{gen_options.hlp}.

EXAMPLES	None

WARNINGS	None

BUGS		No bugs known
