#       main topics:
UP      arb.hlp
UP      glossary.hlp
UP      mode.hlp

#       sub topics:
#SUB     subtopic.hlp

# format described in ../help.readme


TITLE		Reset Physical Zoom

OCCURRENCE	ARB_NT/Reset zoom/Reset Physical Zoom

DESCRIPTION	Restores the initial scale of the tree display.

NOTES           See LINK{mode_pzoom.hlp} on how to zoom.

                You may also reset the zoom by any of the following:

                - slightly resize the main window
                - choose display mode (kind of tree view or similar)

EXAMPLES	None

WARNINGS	None

BUGS		No bugs known
