#       main topics:
UP      arb.hlp
UP      glossary.hlp

#       sub topics:
SUB     set_protection.hlp

# format described in ../help.readme


TITLE		Set global protection level

OCCURRENCE	ARB/<Lock icon>

DESCRIPTION	An individual protection level (0 - 6) can be assigned to
		all types of database entries (sequences and additional
		information stored in a particular 'field').

                In the ARB main window you may select the currently active
                global protection level below the Lock icon.

                ARB protects you from changing any entries in the databases
                that have a protection level higher than the currently active
                global protection level.

NOTES		None

EXAMPLES	None

WARNINGS	It is recommended to reset the protection level after
		performing operations to prevent unintentional modification
		or loss of data.

BUGS		No bugs known

