#       main topics:
UP      arb.hlp
UP      glossary.hlp

#       sub topics:
UP      saiProbe.hlp

# format described in ../help.readme


TITLE		Select display field

OCCURRENCE	ARB/Probes/Match Probes/Match SAI/Properties/Select display field

DESCRIPTION     Allows to select what shall be displayed together with each probe match
                in the 'PROBE AND SAI' window.

                First choose a species database field as basis.

                Then optionally select or enter an ACI expression, to modify the
                content retrieved from the selected database field.

                Select display width of result.

NOTES		See also LINK{aci.hlp}

EXAMPLES	None

WARNINGS	None

BUGS		No bugs known
