#       main topics:
UP      arb.hlp
UP      glossary.hlp

#       sub topics:
#SUB     subtopic.hlp

# format described in ../help.readme


TITLE           Gene Map modes

OCCURRENCE      ARB Gene Map/<mode buttons at left edge>

DESCRIPTION     To select a mode click on one of the mode buttons
                at the left edge of the 'ARB Gene Map' window.

                The name of and basic help for the selected mode are displayed
                at the bottom of the top-area.

                Modes available for genemap:

                  SELECT MODE

                        Click on a gene in genome display to select it.

                  ZOOM MODE

                        Left/right click (or select an area) to zoom in/out.

                  INFO MODE

                        Click on a gene to display its gene information.

NOTES           None

EXAMPLES        None

WARNINGS        None

BUGS            No bugs known
