#       main topics:
UP      multiprobe.hlp

#       sub topics:

# format described in ../help.readme


TITLE		Multiprobe results


DESCRIPTION	Shows the best multi-probes. Each multi-probe has a score, the
		higher the score the better.

		The user may add any string as a comment (or one of the
		three default comments)

		The selected multi-probe can be used to set the colors
		at the tips at the tree. The following colors are used

                   Hit         Colorname     Default
                   ----------------------------------
                   none        "None"        black
                   Probe1      "P1"          red
                   Probe2      "P2"          green
                   Probe3      "P3"          blue
                   Probe1+2    "P7"          yellow
                   Probe2+3    "P8"          cyan
                   Probe3+1    "P9"          magenta
                   Probe1+2+3  "All"         white

NOTE		If you do not see any colors, the colors
                in 'Properties/Tree colors & fonts' are probably misconfigured.



