#       main topics:
UP      arb.hlp
UP      glossary.hlp
UP      helix.hlp

#       sub topics:
SUB     helixsym.hlp

# format described in ../help.readme


TITLE		Toggle secondary info for SAI

OCCURRENCE	ARB_EDIT4/View/Toggle secondary info for SAI

DESCRIPTION     Since it doesn't make sense to display helix
                (or protein structure) information for all SAI,
                display is turned off by default.

                Select an SAI and then this entry to toggle the
                display of the secondary structure information.

NOTES		None

EXAMPLES	None

WARNINGS	None

BUGS		No bugs known
